PARAMETERS:
https://certus.in/site/tinyportscan?<!tps:apiserial=[apiserial]><!tps:host=[host]><!tps:timeout=[seconds]><!tps:start=[port=0-65535]><!tps:end=[port=0-65535]><!tps:sockblock=[0|1]><!tps:scan=[tcp|udp|both]><!tps:realtime=[0|1]><!tps:format=[txt|xml|html]>

USAGE:
https://certus.in/site/tinyportscan?<!tps:apiserial=><!tps:host=3.135.192.97><!tps:timeout=3><!tps:start=0><!tps:end=100><!tps:sockblock=1><!tps:scan=tcp><!tps:realtime=1><!tps:format=html>
